\let\tgtId\tgtIdHydCtr
\newcommand{\tgname}{TMS570}
\newcommand{\tgtBoardName}{Eaton Hydraulics Controller}
\newcommand{\mcuname}{TMS570LS1227ZWT}
\newcommand{\ldscriptname}{TMS570LS1227FlashLnk.cmd}
\newcommand{\tgconfigfilename}{TMS570LS1227.ccxml}
\newcommand{\tgrefman}{tms570xtechnicalreferencemanual2012}
\newcommand{\tgtBoardDoc}{eaton:hydraul_contr_specif}
\newcommand\tgtRtlib{rtsv7R4\_T\_be\_v3D16\_eabi.lib}
